162 Chapter 6. Astrometric Microlensing with the Gaia satellite

Figure 6.18: The recovery of the flat, rising and falling mass functions from the subsamples of high quality astrometric microlensing events generated from simulations. The vertical error bar associated with each bin is proportional to the square root of events in the bin. The horizontal error bar is the size of the bin.