References

Bailey, G. 1987   FET Switch  Multiplexors for Large Area Infrared Focal Plane Arrays

in Infrared Astronomy with Arrays  ed. Wynn-Williams  p13

Baldwin, J. 1988  The COAST Interferometer Project, in  NOAO-ESO Conf. on High

Resolution Imaging by Interferometry  ed. Merkle p935

Baldwin, J. 1994.  Design and Performance of COAST, in Amplitude and Intensity

Spatial Interferometry  SPIE Conf. 2200  ed. Beckinridge, J.

Ballingall, R.A. Review of Infrared Focal Plane Arrays, in Infrared Technology and

Applications  SPIE Conf. 1320  p70

Boysen, R. 1991.   The design of COAST, in High Resolution Imaging by Interferometry

II ,   ESO conference   ed. Beckers  J.

Buscher, D.F.  1988.   Making the most of COAST,  PhD Dissertation . Cambridge 1988

Christou, J.C., Ridgway S.T., Buscher D., Haniff, C.A., McCarthy D. 1991 High Spatial

Resolution Imaging of Circumstellar Envelopes in the Near Infrared,  in Astrophysics with

Infrared Arrays   ASP Conf. 14  ed. Elston

Cornwell, T. 1989  Applications of Closure Phase to Astronomical Imaging,  Science  245

p263

Cox, G.  1991  COAST - Acquisition and Auto-guider system, in High Resolution

Imaging by Interferometry II ,   ESO conference ed. Beckers J.

Dyck, H.M. 1987.  High Spatial Resolution Infrared Observations of Evolved Stars, in

Late Stages of Stellar Evolution ,  ed. Kwok

Dyck, H.M., Kibblewhite E.J.  1986.  Giant Infrared Telescopes for Astronomy,

Publications of the Astronomical Society of the Pacific  98 p260-267

Fizeau C.R.  1896.  Acad. Sci. Paris  66, p934

Fowler, A.M.  Gatley, I.  Vrba, F.B.  Ables, H.D.  Hoffman,A. & Woolaway,J.T.  1994.

Next generation in InSb arrays, ALADIN the 1024 x 1024 InSb focal plane array

development project status report,  in Instrumentation in Astronomy VIII .   SPIE Conf.

2198   ed. Crawford

Fowler, G. 1991.  Noise Reduction Strategy for hybrid IR Focal Plane Arrays, in Infrared

Sensors: Detectors, Electronics and Signal Processing ,  SPIE Conf. 1541  p127

Fowler, G. 1994   Next Generation in InSb arrays, in Instrumentation in Astronomy VIII ,

SPIE Conf.  2198  p623

Fried, D.L.  1966.  Optical Resolution Through a Randomly Inhomogeneous Medium for

Very Long and Very Short Exposures, Journal Optical Society of America  56  p1372

Gillett, F.C.  1987.  Infrared Arrays for Ground-Based Astronomy in Infrared Astronomy

with Arrays  ed. Wynn-Williams  p13

Goodman J.W.  1985.  Statistical Optics , Wiley  New York

Haniff, C.A.  Baldwin, J.E.   Warner,P.J.  &  Scott,T.R. 1994 Atmospheric phase

fluctuation measurement: interferometric results from the WHT and COAST telescopes.

in Amplitude and Intensity Spatial Interferometry  SPIE Conf. 2200  ed. Beckinridge, J.

Haniff, C.A. 1988  Phase Closure Imaging - Theory and Practice, in  Diffraction Limited

Imaging with Very Large Telescopes .  NATO ASI 274 ed Alloin

Hodapp, K.W.  Hall, D.B.  Vural, K.  etal  1994  Status report on 1024x1024 HgCdTe

detector arrays for low background operations in the 1.0 - 2.5 m m range, in

Instrumentation in Astronomy VIII ,   SPIE Conf.  2198  p668

Hoffman, A.W.  1987 Operation and Calibration of Self-Integrating Multiplexed Arrays,

in Infrared Astronomy with Arrays  ed. Wynn-Williams  p13

Irvine, S.J. 1992  Recent Developments in MOCVD of HgCdTe, in Infrared Detectors:

State of the Art ,   SPIE Conf. 1735  p92

Joyce, R. 1992  Observing with Infrared Arrays, in Astronomical CCD observing and

Reduction Techniques  ASP Conf. 23  ed. Howell   p258

Korsch, D.  1991.   Reflective Optics.  Academic Press 1991

Kozlowski, L.J.  Vural, K.  Johnson, V.H.  Chen, R.B.  Bailey,R.B. & Bui, D. 1990.

256x256 PACE-1 PV HgCdTe focal plane arrays for medium and short wavelength

applications, in Infrared Detectors and Focal Plane Arrays  SPIE Conf. 1308  p202

Lockwood, G.W. 1972.  Near-Infrared Photometry of Mira Variables,  Astrophysical

Journal Supplement  209  p375

Mackay, C.D.  1986  Charge Coupled Devices in Astronomy,  in Annual Reviews of

Astronomy and Astrophysics .  Volume 24   p255-283

McCaughrean, M. 1989  Reduction and Analysis Techniques for Infrared Imaging Data, in

Proceedings of the Third Infrared Detector Technology Workshop , ed. McCreight  p201

McLean,I.S.  1987.  Results with the UKIRT infrared camera,  in Infrared Astronomy

with Arrays ,  ed. Wynn-Williams & Becklin    p180

Melles-Griot.  1990.  Melles-Griot Optics Guide 5 th  Edition.

Merkle, F.  1988.   The Interferometric mode of the European Very Large Telescope.  in

High Resolution Imaging by Interferometry II ,   ESO conference ed. Beckers J.   p909

Michelson A.A.  1891  Nature  45, p160

Michelson A.A., Pearce F.G. 1921. Measurement of the Diameter of a  Orionis with the

Interferometer,  Astrophysical. Journal  53, p249

Nightingale, N.S.  1991.  Stellar Interferometry - Detectors and the Atmopshere, PhD

Dissertation .  Cambridge 1991

Perley 1989.  Synthesis Imaging in Radio Astronomy, ASP conference Series 6

RCA Electro Optics 1988   Planar InGaAs APD C30644, C30645 , RCA data sheet

Readhead, A.C.S. etal   1988. Diffraction Limited Imaging with Ground-Based Optical

Telescopes, Astronomical Journal  95  p1278

Ridgway, S.T. 1988. Astrophysical Programs for High Angular Resolution Optical

Interferometry, in  Diffraction Limited Imaging with Very Large Telescopes .  NATO ASI

274 ed. Alloin

Rieke, M.J.  Rieke, G.H. 1993a. Ground based Experience with NICMOS arrays, in

Infrared Detectors and Instrumentation   SPIE Conf. 1946  p179

Rieke, M.J.  Winters, G.S. Cadien, J. & Rasche, R. 1993b.  Characterization of NICMOS

detectors for Space Astronomy,  in  Infared Detectors and Instrumentation SPIE Conf.

1946  p214

Roberts C.G. 1980.  Monolithic HgCdTe Focal Plane Array Structures, in Advances in

Focal Plane Technology ,  SPIE Conf. 217

Rockwell 1993.   NICMOS 3 Focal Plane array report Contract 8752, private

communication

Roddier, F. 1988. Interferometric Imaging in Optical Astronomy, in Progress in Optics 19

p98  ed.  Wolf

 Rode, J.P  Blackwell,J.D.  Blessinger,M.A.  Vural,K.  1987. SWIR HgCdTe Focal Plane

Arrays for Astronomy, in Infrared Astronomy with Arrays ,  ed. Wynn-Williams & Becklin

p13

Simon, M. etal 1992.  Multiplicity among the Young Stars in Taurus. Astrophysical

Journal , 384  p212

Tango, W.J.  Twiss, R.Q. 1980. Michelson Stellar Interferometry, in Progress in Optics

17 p239  ed.  Wolf

Thomson, R.C., Mackay, C.D., Wright A.E. 1993.  Internal Structure and Polarization of

the Optical Jet of the Quasar 3C273.  Nature 365 p133

Vural, K.  Kozlowski,L.  Rasche,B. & Rieke,M.  1990.  256x256 HgCdTe focal plane

array for the Hubble Space Telescope, in Infrared Technology and Applications   SPIE

Conf. 1320  p107

Walmsteker, W.  1981.  Standard Stars and Calibration for JHKLM Photometry,  in

Astronomy and  Astrophysics   97  p329

Weckler, G.P.  Hudson, L.R.  Tseng,H.F. & Lang,W.L.  1987.  Solid State Line Scanners

employing PtSi Shottky-barrier Detectors,  in Infrared Astronomy with Arrays ,  ed. Wynn-

Williams & Becklin    p75

Wolfe, W.L. & Zissis, G.  1989.  The Infrared Handbook. Office of Naval Research,

Washington  p11-3