                                          Note:  Measurements done on previous "recipe" of BARR H filters at 77 K.

B a r r  H  F i l t e r

                                                                                                                  1000 1500 2000 2500 3000

                                                                                                        0.01

                                                                                                           0.1

                                                                                                                 1

                                                                                                              10

                                                                                                          100

Transmission (%)

Wavelength (nm)

                                                                                                                   1400 1500 1600 1700 1800 1900

                                                                                                                  0

                                                                                                              20

                                                                                                              40

                                                                                                              60

                                                                                                              80

                                                                                                          100

Wavelength (nm)