CIRSI Project Financial Statement Date: 31 May 1996

All prices include duty and VAT where they are unavoidable.

Detector System Budget Current estimate Spent Committed

£ £ £ £

4 1024 x 1024 Rockwell Arrays 210000 210000 54054 210000

Controller (AstroCam 4100) 21000 20874 20874 20874

Temperature Sensors 1000 1000

Control PCs 3000 2847 2847 2847

Frame Grabber 1800 1800

Image Library 1800 1800

Development Software 600 600

SAM Developer 1200 1470 1470 1470

Hard Disks 3500 3500

Tape Drive 20 Gb DLT 3500 3500

Cables 1000 1000

Total cost of Detector Sub-System 248400 248391 79245 235191

Camera Components

Large Dewar 8000 8000

Filters 8000 3552.5 3552.5 3552.5

Filter Wheel Mechanism 2000 2000

Shutter 600 600

Parts and Components 3000 3000

Autoguider CCD 10000 13512.5

Autoguider computer 2400 2000

Autoguider optics 2000 1500

Total Cost of Camera Components 36000 34165 3552.5 3552.5

Cassegrain Field Corrector/Focal Reducer

Corrector Optics 20000 20000

Mechanical Structure 6000 6000

Total Cost of Cassegrain Adapter 26000 26000 0 0

Infrastructure Costs: Manpower and Facilities

Francois Piche, 6 man-months 12000 12000 12000

Martin Beckett, 35 man-months 56000 50000 8500 41500

Contract Technician, 4 man-months 7000 7000

Design Engineer, 6 man-months 12000 9000 2250 6750

SPO refurtbishment 5000 5000 2425 2425

Shipping and Travel 20000 20000

Total Cost of Manpower anf Infrastructure 112000 103000 13175 62675

Total Project Cost 422400 411556 95972.5 301418.5