INT OBSERVING LOG (ISAAC NEWTON GROUP, LA PALMA)

TELESCOPE:            INT
DATE:                 20010423
TAPE NR:
OBSERVER:             Corradi, Zurita et al
PROGRAMME:            The Local Group Census
PATT/CAT REF.:        2001A/WFS04
TELESCOPE OPERATOR:   none
SUPPORT ASTRONOMER:   N. Walton

TELESCOPE FOCUS:      46.25 mm
CALIBRATE RESULTS:    not specified

INSTRUMENT:           WFC

WEATHER:              (1st half) bad
                      (2nd half) bad
CLOUD COVER (%):      (1st half) 100
                      (2nd half) 100
DUST (0-2):           (1st half) 0
                      (2nd half) 0
SEEING (arcsec):      (1st half)
                      (2nd half)

DOME OPENED (UT):     19:30

METEOROLOGICAL PARAMETERS
LT      AirT  Hum%  Wspd  Gust  Wdir  Press LocT  IntT  Mirr  LocRH IntRH
20:00   9.3   7     15.3  19.1  221   767.1 10.0  12.8  12.0  5     7
21:00   8.6   7     16.0  18.6  183   767.2 9.0   10.5  11.3  5     7
22:00   8.8   5     22.1  25.6  208   767.4 9.3   10.5  11.2  4     6
23:00   8.7   5     4.3   4.9   272   767.9 9.3   10.5  11.1  3     6
00:00   9.4   4     13.2  15.8  189   768.1 9.8   11.3  11.3  3     6
01:00   10.5  3     15.4  16.6  213   767.7 10.5  11.4  11.6  3     6
02:00   9.2   5     15.2  17.6  161   767.2 9.6   10.8  11.5  4     4
03:00   8.2   6     16.9  17.9  165   766.7 8.7   9.8   11.0  5     5
04:00   8.4   4     23.1  25.8  176   766.3 9.1   10.7  11.2  3     7
05:00   7.7   4     24.8  28.1  178   765.9 8.3   10.7  11.4  3     6
06:00   7.2   3     19.5  20.8  139   765.8 7.8   10.7  11.1  2     6

SUNSET(UT)            19:49
EVENING TWILIGHT(UT)  21:05
MORNING TWILIGHT(UT)  05:13
SUNRISE(UT)           06:30
MOON’S QUARTER (1-4)  1
DISK % OF ILLUM.      0
DARK TIME             08:08
TWILIGHT TIME         02:33
MOONRISE(UT)          No moonrise within sunset-sunrise
MOONSET(UT)           19:50

TIME LOST(WEATHER):   08:08
TIME LOST(TECHNICAL): 01:00
TIME LOST(OTHER):     00:00

Run no. Object name              RA         Dec.     Equinox    AM    PA     UT       Exp. T.   Filter      Psys Channel  Binning Comments
 257833 Bias                  3:12:22.99 +45:45:45.0 A        1.080 180.0 13:04:46.8      0.0                ubvy           1 x 1
 257834 Bias                  0:00:00.00 +00:00:00.0 A        1.000 180.0 13:22:10.6      0.0 HeII4686 Narrow-ban           1 x 1
 257835 ha test               0:00:00.00 +00:00:00.0 A        1.000 180.0 13:26:55.7      3.1   Halpha Narrow-ban           1 x 1

Jun 18, 02 12:14 Page 1/2

20010423.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 1/2

20010423.int

 257836 Useless bias          0:00:00.00 +00:00:00.0 A        1.000 180.0 19:14:22.8      0.0 HeII4686 Narrow-ban           1 x 1
 257837 skyflat SII           8:01:00.00 +49:59:59.9 J2000.00 1.095 180.0 20:03:47.7     25.1 [SII]672 Narrow ban           1 x 1
 257838 skyflat SII           8:01:01.03 +50:00:10.0 J2000.00 1.096 180.0 20:06:03.3     45.1 [SII]672 Narrow ban           1 x 1
 257839 skyflat SII           8:01:02.07 +50:00:19.9 J2000.00 1.098 180.0 20:08:20.5     77.0 [SII]672 Narrow ban           1 x 1
 257840 skyflat r             8:01:02.07 +50:00:19.9 J2000.00 1.101 180.0 20:11:34.6     19.6        r      Sloan           1 x 1
 257841 skyflat r             8:01:01.03 +50:00:09.9 J2000.00 1.102 180.0 20:13:05.6     27.1        r      Sloan           1 x 1
 257842 skyflat r             8:00:58.96 +49:59:49.9 J2000.00 1.104 180.0 20:14:48.4      9.6        r      Sloan           1 x 1
 257843 skyflat r             8:00:58.96 +49:59:50.0 J2000.00 1.105 180.0 20:16:24.8     65.1        r      Sloan           1 x 1
 257844 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:31:39.2      0.0        r      Sloan           1 x 1
 257845 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:32:18.8      0.0        r      Sloan           1 x 1
 257846 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:32:57.9      0.0        r      Sloan           1 x 1
 257847 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:33:37.0      0.0        r      Sloan           1 x 1
 257848 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:34:16.5      0.0        r      Sloan           1 x 1
 257849 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:35:01.2      0.0        r      Sloan           1 x 1
 257850 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:35:54.6      0.0        r      Sloan           1 x 1
 257851 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:36:39.0      0.0        r      Sloan           1 x 1
 257852 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:37:23.1      0.0        r      Sloan           1 x 1
 257853 bias frames           0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:38:08.2      0.0        r      Sloan           1 x 1
 257854 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:39:44.6      0.0        r      Sloan           1 x 1
 257855 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:40:30.9      0.0        r      Sloan           1 x 1
 257856 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:41:14.7      0.0        r      Sloan           1 x 1
 257857 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:41:58.7      0.0        r      Sloan           1 x 1
 257858 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:42:43.3      0.0        r      Sloan           1 x 1
 257859 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:43:24.6      0.0        r      Sloan           1 x 1
 257860 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:44:04.2      0.0        r      Sloan           1 x 1
 257861 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:44:53.4      0.0        r      Sloan           1 x 1
 257862 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:45:43.4      0.0        r      Sloan           1 x 1
 257863 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:46:26.5      0.0        r      Sloan           1 x 1
 257864 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:48:09.1      0.0        r      Sloan           1 x 1
 257865 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:48:53.2      0.0        r      Sloan           1 x 1
 257866 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:49:37.8      0.0        r      Sloan           1 x 1
 257867 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:50:21.1      0.0        r      Sloan           1 x 1
 257868 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:51:03.6      0.0        r      Sloan           1 x 1
 257869 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:51:43.0      0.0        r      Sloan           1 x 1
 257870 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:52:28.1      0.0        r      Sloan           1 x 1
 257871 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:53:07.7      0.0        r      Sloan           1 x 1
 257872 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:53:49.9      0.0        r      Sloan           1 x 1
 257873 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:54:32.3      0.0        r      Sloan           1 x 1
 257874 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:56:07.2      0.0        r      Sloan           1 x 1
 257875 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:56:50.4      0.0        r      Sloan           1 x 1
 257876 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:57:32.6      0.0        r      Sloan           1 x 1
 257877 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:58:14.2      0.0        r      Sloan           1 x 1
 257878 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:58:57.9      0.0        r      Sloan           1 x 1
 257879 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 20:59:39.6      0.0        r      Sloan           1 x 1
 257880 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:00:24.1      0.0        r      Sloan           1 x 1
 257881 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:01:03.8      0.0        r      Sloan           1 x 1
 257882 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:01:46.1      0.0        r      Sloan           1 x 1
 257883 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:02:29.4      0.0        r      Sloan           1 x 1
 257884 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:03:58.8      0.0        r      Sloan           1 x 1
 257885 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:04:39.7      0.0        r      Sloan           1 x 1
 257886 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:05:19.6      0.0        r      Sloan           1 x 1
 257887 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:05:59.5      0.0        r      Sloan           1 x 1
 257888 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:06:40.5      0.0        r      Sloan           1 x 1
 257889 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:07:21.8      0.0        r      Sloan           1 x 1
 257890 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:08:04.6      0.0        r      Sloan           1 x 1
 257891 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:08:53.6      0.0        r      Sloan           1 x 1
 257892 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:09:34.2      0.0        r      Sloan           1 x 1
 257893 bias frame            0:00:00.00 +00:00:00.0 J2000.00 2.900 180.0 21:10:13.5      0.0        r      Sloan           1 x 1
 257895 test draco i         17:20:12.39 +57:54:55.0 J2000.00 1.569 180.0 00:20:26.7     60.1        i      Sloan           1 x 1
 257896 draco i              17:20:12.40 +57:54:54.9 J2000.00 1.506 180.0 00:31:19.2    599.4        i      Sloan           1 x 1
 257897 m51 stY-test         13:29:52.69 +47:11:43.0 J2000.00 1.059 180.0 00:57:18.1    599.5                ubvy           1 x 1
 257899 m51 HA               13:29:52.70 +47:11:42.9 J2000.00 1.075 180.0 01:19:54.9   1198.8   Halpha Narrow-ban           1 x 1

Jun 18, 02 12:14 Page 2/2

20010423.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 2/2

20010423.int