INT OBSERVING LOG (ISAAC NEWTON GROUP, LA PALMA)

TELESCOPE:            INT
DATE:                 20010318
TAPE NR:
OBSERVER:             Jonathan Davies, Sabina Sabatini
PROGRAMME:            WFS virgo
PATT/CAT REF.:        WFS2
TELESCOPE OPERATOR:   P. Sorensen
SUPPORT ASTRONOMER:   none

TELESCOPE FOCUS:      46.20 mm
CALIBRATE RESULTS:    not specified

INSTRUMENT:           WFC

WFC FILTER WHEEL:     UBVriHa

WEATHER:              (1st half) good
                      (2nd half) good
CLOUD COVER (%):      (1st half) 0
                      (2nd half) 0
DUST (0-2):           (1st half) 0
                      (2nd half) 0
SEEING (arcsec):      (1st half) 1.
                      (2nd half) 1.3

DOME OPENED (UT):     19:30

METEOROLOGICAL PARAMETERS
 LT     AirT  Hum%  Wspd  Gust  Wdir  Press LocT IntT  Mirr  LocRH IntRH
20:00   6.3   11    6.0   8.7   206   767.2 6.8   8.8   9.3   7     9
21:00   8.6   2     10.9  11.4  277   767.9 9.2   8.9   9.5   1     4
22:00   9.8   1     4.6   4.9   261   768.2 10.0  9.7   9.6   1     3
23:00   9.6   1     0.0   0.0   259   768.5 9.8   9.8   9.8   0     2
00:00   9.5   0     7.0   7.2   169   768.3 10.0  9.9   10.2  1     2
01:00   8.7   1     10.6  10.9  170   768.1 9.2   9.5   9.5   0     1
02:00   8.7   1     14.6  17.6  148   768.0 9.1   9.7   9.7   0     1
03:00   8.8   2     12.1  15.5  162   767.7 9.3   9.9   9.8   0     1
04:00   8.5   2     17.5  19.2  211   767.2 8.9   9.5   9.8   0     2
05:00   7.2   2     20.8  23.7  226   766.9 7.3   8.8   9.6   1     2
06:00   7.2   5     23.8  25.3  231   766.9 7.5   8.6   9.4   4     6

SUNSET(UT)            19:28
EVENING TWILIGHT(UT)  20:40
MORNING TWILIGHT(UT)  05:58
SUNRISE(UT)           07:10
MOON’S QUARTER (1-4)  4
DISK % OF ILLUM.      30
DARK TIME             09:18
TWILIGHT TIME         02:24
MOONRISE(UT)          03:52
MOONSET(UT)           No moonset within sunset-sunrise

TIME LOST(WEATHER):   00:00
TIME LOST(TECHNICAL): 00:30
TIME LOST(OTHER):     00:00

COMMENTS:
  Everything fine except one small problem with initial files settings.
  Small problems with the Autoguider: we had to reset the pointing.
  Why is it so cold in the control room?

Jun 18, 02 12:14 Page 1/2

20010318.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 1/2

20010318.int

Run no. Object name              RA         Dec.     Equinox    AM    PA     UT       Exp. T.   Filter      Psys Channel  Binning Comments
 252032 Flat field            4:25:46.00 +54:09:03.0 B1950.00 1.205 180.0 19:58:27.3    111.5        i      Sloan           1 x 1
 252033 Bias frame            4:25:46.00 +54:09:03.0 B1950.00 1.230 180.0 20:13:31.2      0.0        i      Sloan           1 x 1
 252034 Bias frame            4:25:46.00 +54:09:03.0 B1950.00 1.251 180.0 20:23:58.6      0.0        i      Sloan           1 x 1
 252035 Bias frame            6:52:11.79 -00:18:23.8 J2000.00 1.145 180.0 20:26:23.8      0.0        i      Sloan           1 x 1
 252036 Focus run             6:52:11.80 -00:16:24.0 J2000.00 1.145 180.0 20:30:51.6     10.1        i      Sloan           1 x 1
 252037 98-671                6:52:11.80 -00:18:24.0 J2000.00 1.148 180.0 20:37:03.6     10.1        i      Sloan           1 x 1
 252038 98-671                6:52:11.80 -00:18:23.9 J2000.00 1.149 180.0 20:38:39.0     10.1        i      Sloan           1 x 1
 252039 100-280               8:53:35.40 -00:36:41.9 J2000.00 1.262 180.0 20:40:43.6      9.6        i      Sloan           1 x 1
 252040 100-280               8:53:35.40 -00:36:42.0 J2000.00 1.256 180.0 20:43:13.7     10.1        i      Sloan           1 x 1
 252041 101-421               9:57:16.10 -00:17:19.0 J2000.00 1.474 180.0 20:46:28.0     10.1        i      Sloan           1 x 1
 252043 UM-2                 11:32:35.01 +52:44:04.9 J2000.00 1.414 180.0 21:20:04.3    999.1        i      Sloan           1 x 1
 252044 UM-3                 11:32:34.99 +52:24:04.9 J2000.00 1.340 180.0 21:41:41.4    999.0        i      Sloan           1 x 1
 252045 UM-4                 11:32:35.00 +52:04:05.0 J2000.00 1.280 180.0 22:02:28.3    999.0        i      Sloan           1 x 1
 252046 UM3                  11:32:34.99 +54:24:05.2 J2000.00 1.242 180.0 22:26:13.7    999.0        i      Sloan           1 x 1
 252047 VIRGO313             12:35:42.89 +12:24:00.1 J2000.00 1.444 180.0 22:46:30.6    998.5        i      Sloan           1 x 1
 252048 VIRGO314             12:37:49.79 +12:24:00.0 J2000.00 1.348 180.0 23:07:32.0    998.9        i      Sloan           1 x 1
 252049 VIRGO315             12:39:56.80 +12:24:00.0 J2000.00 1.265 180.0 23:30:20.9    999.2        i      Sloan           1 x 1
 252050 VIRGO317             12:44:10.70 +12:24:00.0 J2000.00 1.161 180.0 00:10:11.6    998.6        i      Sloan           1 x 1
 252051 VIRGO318             12:46:17.70 +12:24:00.0 J2000.00 1.119 180.0 00:32:18.9    999.0        i      Sloan           1 x 1
 252052 VIRGO319             12:48:24.70 +12:23:59.9 J2000.00 1.084 180.0 00:57:52.0    999.1        i      Sloan           1 x 1 Autoguider fault
 252053 VIRGO316             12:42:03.79 +12:24:00.0 J2000.00 1.047 180.0 01:35:19.6    998.5        i      Sloan           1 x 1
 252054 101-330               9:56:20.60 -00:27:22.9 J2000.00 1.458 180.0 01:53:51.7     10.1        i      Sloan           1 x 1
 252055 104-367              12:43:58.49 -00:33:34.9 J2000.00 1.149 180.0 01:55:34.5     10.1        i      Sloan           1 x 1
 252056 107-592               0:00:00.00 +00:00:00.0 J2000.00 1.665 180.0 01:57:04.7     10.1        i      Sloan           1 x 1
 252057 VIRGO319             12:48:24.70 +12:23:59.9 J2000.00 1.042 180.0 02:00:59.4    999.0        i      Sloan           1 x 1
 252058 VIRGO320             12:50:31.59 +12:24:00.0 J2000.00 1.044 180.0 02:21:53.4    999.1        i      Sloan           1 x 1
 252059 VIRGO345             12:18:45.30 +13:03:59.6 J2000.00 1.093 180.0 02:51:45.9    999.0        i      Sloan           1 x 1
 252060 VIRGO346             12:20:52.59 +13:04:00.1 J2000.00 1.122 180.0 03:11:40.7    999.0        i      Sloan           1 x 1
 252061 VIRGO365             12:18:44.30 +13:24:00.0 J2000.00 1.168 180.0 03:31:27.2    998.9        i      Sloan           1 x 1
 252062 VIRGO366             12:20:51.80 +13:24:00.0 J2000.00 1.216 180.0 03:51:08.3    999.1        i      Sloan           1 x 1
 252063 VIRGO386B            12:20:50.89 +13:42:30.0 J2000.00 1.295 180.0 04:14:30.5    999.0        i      Sloan           1 x 1
 252064 VIRGO405             12:18:42.20 +14:04:00.1 J2000.00 1.392 180.0 04:34:48.2    999.1        i      Sloan           1 x 1
 252065 VIRGO406              6:10:25.05 +07:02:00.1 J2000.00 1.491 180.0 04:54:22.5    998.9        i      Sloan           1 x 1
 252066 VIRGO425             12:18:41.19 +14:24:00.0 J2000.00 1.654 180.0 05:15:33.5    999.0        i      Sloan           1 x 1
 252067 VIRGO426             12:20:49.20 +14:23:59.9 J2000.00 1.826 180.0 05:35:51.1    999.0        i      Sloan           1 x 1
 252068 107-592              15:38:50.30 -00:17:09.0 J2000.00 1.173 180.0 05:54:46.9     10.1        i      Sloan           1 x 1
 252069 104-367              12:43:58.50 -00:33:35.0 J2000.00 2.119 180.0 05:56:48.3     10.1        i      Sloan           1 x 1
 252070 110-361              18:42:45.00 +00:08:05.0 J2000.00 1.341 180.0 05:59:13.9     10.1        i      Sloan           1 x 1
 252071 Bias frame           16:47:52.50 -15:17:44.0 B1950.00 1.395 180.0 06:02:42.1      0.0        i      Sloan           1 x 1
 252072 Bias frame           16:47:52.49 -15:17:43.9 B1950.00 1.394 180.0 06:04:08.2      0.0        i      Sloan           1 x 1
 252073 Bias frame           16:47:52.50 -15:17:43.9 B1950.00 1.393 180.0 06:06:14.1      0.0        i      Sloan    1      1 x 1
 252074 Flat field           16:47:52.49 -15:17:44.0 B1950.00 1.403 180.0 06:40:20.3     86.3        i      Sloan    1      1 x 1
 252075 Flat field           16:47:52.50 -15:17:43.9 B1950.00 1.405 180.0 06:43:21.7     42.1        i      Sloan    1      1 x 1
 252076 Flat field           16:47:53.19 -15:17:34.0 B1950.00 1.407 180.0 06:45:33.4     24.0        i      Sloan    1      1 x 1
 252077 Flat field           16:47:53.19 -15:17:54.0 B1950.00 1.409 180.0 06:47:14.3     15.3        i      Sloan    1      1 x 1
 252078 Flat field           16:47:51.81 -15:17:54.0 B1950.00 1.411 180.0 06:49:01.4      9.3        i      Sloan    1      1 x 1
 252079 Flat field           16:47:51.80 -15:17:34.0 B1950.00 1.412 180.0 06:50:29.1      7.2        i      Sloan    1      1 x 1

Jun 18, 02 12:14 Page 2/2

20010318.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 2/2

20010318.int