INT OBSERVING LOG (ISAAC NEWTON GROUP, LA PALMA)

TELESCOPE:            INT
DATE:                 1998 DEC 22/23
INT TAPE NR:          INTD3907/08
OBSERVER:             N. Walton
PROGRAMME:            WFC Survey
PATT/CAT:             WFS 9
TELESCOPE OPERATOR:   P. Sorensen
SUPPORT ASTRONOMER:   N. Walton

FOCUS:                PRIME
INSTRUMENT:           WFC
FILTER WHEEL (PF):    I, U, R, V, Z, B
CAMERA (IDS):         -
COLLIMATOR (IDS):     -
COLL. FOCUS (IDS):    -
GRATING (IDS):        -
DETECTOR:             4xEEV
PIXELS:               2k x 4k
PIXEL SIZE (microns): 13.5
WINDOW:               none
BINNING:              none

WEATHER:               Bad
OUTSIDE TEMP (deg C):   0.2             (FIRST HALF)
OUTSIDE TEMP (deg C):   0.8             (SECOND HALF)
HUMIDITY (%):           100             (FIRST HALF)
HUMIDITY (%):           100             (SECOND HALF)
CLOUD COVER (%):        100             (FIRST HALF)
CLOUD COVER (%):        100             (SECOND HALF)
DUST (0 - 2):            0              (FIRST HALF)
DUST (0 - 2):            0              (SECOND HALF)
SEEING (arcsec):         -              (FIRST HALF)
SEEING (arcsec):         -              (SECOND HALF)
AV. SEEING (arcsec):     -
NO. SEEING MEASURES:     -

UTC    TELESCOPE                 CASELLA OUT   CASELLA IN    SEEING
       AZ   EL  Focus  TComp     Temp   Humid  Temp   Humid  Det./TV  Comments

DARK HOURS:           10:53
DOME OPEN (UTC):      --:--
MOON PHASE (D/G/B):       D
DK HRS LOST (WEATHER):10:53
DK HRS LOST (TELESC): 00:00
DK HRS LOST (DOME):   00:00
DK HRS LOST (INSTR.): 00:00
DK HRS LOST (DET.):   00:00
DK HRS LOST (COMPS.): 00:00
DK HRS LOST (A&G):    00:00
DK HRS LOST (OTHER):  00:00

COMMENTS:
All night lost due to bad weather

Run no. Object name              RA         Dec.     Equinox    AM    PA     UT       Exp. T.   Filter      Psys Channel  Binning Comments
 141082 Bias frame           17:59:59.99 +20:00:00.1 J2000.00 1.078 179.8 14:36:05.9      0.0        z       Gunn    1      1 x 1
 141086 Dome Z 40s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 15:51:33.4     40.0        z       Gunn    1      1 x 1
 141090 Dome Z 48s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 15:57:07.0     48.1        z       Gunn    1      1 x 1
 141094 Dome Z 40s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:00:49.9     40.1        z       Gunn    1      1 x 1
 141098 Dome Z 32s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:04:25.0     32.1        z       Gunn    1      1 x 1

Jun 18, 02 12:15 Page 1/2

19981222.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 1/2

19981222.int

 141102 Dome Z 24s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:07:52.5     24.1        z       Gunn    1      1 x 1
 141106 Dome Z 18s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:11:11.2     18.1        z       Gunn    1      1 x 1
 141110 Dome Z 12s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:14:23.8     12.1        z       Gunn    1      1 x 1
 141114 Dome Z 10s            0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:17:31.7     10.1        z       Gunn    1      1 x 1
 141118 Dome Z 6s             0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:20:37.5      6.1        z       Gunn    1      1 x 1
 141122 Dome Z 4s             0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:23:38.2      4.1        z       Gunn    1      1 x 1
 141126 Dome Z 3s             0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:26:37.5      3.1        z       Gunn    1      1 x 1
 141130 Dome Z 2s             0:00:00.00 +00:00:00.0 J2000.00 1.056 179.8 16:29:36.4      2.1        z       Gunn    1      1 x 1
 141138 Dome 48s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 16:43:57.2     48.0        z       Gunn    1      1 x 1
 141142 Dome 40s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 16:47:39.7     40.1        z       Gunn    1      1 x 1
 141146 Dome 32s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 16:51:15.0     32.1        z       Gunn    1      1 x 1
 141150 Dome 24s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 16:54:41.5     24.1        z       Gunn    1      1 x 1
 141154 Dome 18s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 16:58:00.6     17.6        z       Gunn    1      1 x 1
 141158 Dome 12s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:01:13.4     12.1        z       Gunn    1      1 x 1
 141162 Dome 10s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:04:19.5      9.7        z       Gunn    1      1 x 1
 141166 Dome 8s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:07:24.5      8.1        z       Gunn    1      1 x 1
 141170 Dome 6s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:10:26.8      6.0        z       Gunn    1      1 x 1
 141174 Dome 4s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:13:27.6      4.1        z       Gunn    1      1 x 1
 141178 Dome 3s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:16:28.0      3.1        z       Gunn    1      1 x 1
 141182 Dome 2s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:19:26.1      2.1        z       Gunn    1      1 x 1
 141186 Dome 1s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 17:22:22.7      1.1        z       Gunn    1      1 x 1
 141190 Dome 48s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:21:43.6     47.6        I    INT-WFC    1      1 x 1
 141194 Dome 40s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:25:25.9     40.1        I    INT-WFC    1      1 x 1
 141198 Dome 32s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:29:02.4     32.1        I    INT-WFC    1      1 x 1
 141202 Dome 24s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:32:28.8     24.1        I    INT-WFC    1      1 x 1
 141214 Dome 10s              0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:36:01.8     10.1        I    INT-WFC    1      1 x 1
 141218 Dome 8s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:39:07.1      8.3        I    INT-WFC    1      1 x 1
 141222 Dome 6s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:42:09.7      6.1        I    INT-WFC    1      1 x 1
 141226 Dome 4s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:45:11.4      4.1        I    INT-WFC    1      1 x 1
 141230 Dome 3s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:48:09.9      2.6        I    INT-WFC    1      1 x 1
 141238 Dome 1s               0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 18:51:14.4      1.1        I    INT-WFC    1      1 x 1
 141242 Bias frame            0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 20:18:01.8      0.0        I    INT-WFC    1      1 x 1
 141246 Bias frame            0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 20:20:54.3      0.0        I    INT-WFC    1      1 x 1
 141250 Bias frame            0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 20:23:47.4      0.0        I    INT-WFC    1      1 x 1
 141254 Bias frame            0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 20:26:40.6      0.0        I    INT-WFC    1      1 x 1
 141258 Bias frame            0:00:00.00 +00:00:00.0 J2000.00 1.477 179.8 20:29:33.0      0.0        I    INT-WFC    1      1 x 1
 141262 Dome 48s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:09:17.8     48.1        V     Harris    1      1 x 1
 141266 Dome 40s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:13:00.2     40.1        V     Harris    1      1 x 1
 141270 Dome 32s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:16:35.0     32.1        V     Harris    1      1 x 1
 141274 Dome 24s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:20:01.7     23.6        V     Harris    1      1 x 1
 141278 Dome 18s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:23:20.4     18.1        V     Harris    1      1 x 1
 141282 Dome 12s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:26:33.8     12.1        V     Harris    1      1 x 1
 141286 Dome 10s              0:00:00.00 +00:00:00.0 A        1.780 179.8 21:29:40.6      9.1        V     Harris    1      1 x 1
 141290 Dome 8s               0:00:00.00 +00:00:00.0 A        1.780 179.8 21:32:45.4      8.1        V     Harris    1      1 x 1
 141294 Dome 6s               0:00:00.00 +00:00:00.0 A        1.780 179.8 21:35:48.6      5.6        V     Harris    1      1 x 1
 141298 Dome 4s               0:00:00.00 +00:00:00.0 A        1.780 179.8 21:38:50.9      4.1        V     Harris    1      1 x 1
 141302 Dome 3s               0:00:00.00 +00:00:00.0 A        1.780 179.8 21:41:49.0      3.1        V     Harris    1      1 x 1
 141306 Dome 2s               0:00:00.00 +00:00:00.0 A        1.780 179.8 21:44:47.3      2.1        V     Harris    1      1 x 1
 141310 Dome 1s               0:00:00.00 +00:00:00.0 A        1.780 179.8 21:47:44.4      1.1        V     Harris    1      1 x 1

Jun 18, 02 12:15 Page 2/2

19981222.int

Printed by Simon Hodgkin

Wednesday June 19, 2002 2/2

19981222.int